<template>
  <path
    d="M16.5 8.00024C16.78 8.00024 17 7.78024 17 7.50024V3.50024C17 3.22024 16.78 3.00024 16.5 3.00024C16.22 3.00024 16 3.22024 16 3.50024V7.50024C16 7.78024 16.22 8.00024 16.5 8.00024ZM12.5 7.00024C12.22 7.00024 12 7.22024 12 7.50024C12 7.78024 12.22 8.00024 12.5 8.00024H14.45C14.75 8.00024 15 7.75024 15 7.45024V5.55024C15 5.25024 14.75 5.00024 14.45 5.00024H13V4.00024H14.5C14.78 4.00024 15 3.78024 15 3.50024C15 3.22024 14.78 3.00024 14.5 3.00024H12.55C12.25 3.00024 12 3.25024 12 3.55024V5.44024C12 5.75024 12.25 6.00024 12.55 6.00024H14V7.00024H12.5ZM20.45 3.00024H18.56C18.25 3.00024 18 3.25024 18 3.55024V7.50024C18 7.78024 18.22 8.00024 18.5 8.00024C18.78 8.00024 19 7.78024 19 7.50024V6.00024H20.45C20.75 6.00024 21 5.75024 21 5.45024V3.55024C21 3.25024 20.75 3.00024 20.45 3.00024ZM20 5.00024H19V4.00024H20V5.00024ZM19.21 15.2702L16.67 14.9802C16.06 14.9102 15.46 15.1202 15.03 15.5502L13.19 17.3902C10.36 15.9502 8.04003 13.6402 6.60003 10.8002L8.45003 8.95024C8.88003 8.52024 9.09003 7.91024 9.02003 7.31024L8.73003 4.79024C8.62003 3.78024 7.76003 3.01024 6.75003 3.01024H5.02003C3.89003 3.01024 2.95003 3.95024 3.02003 5.08024C3.55003 13.6202 10.38 20.4402 18.91 20.9702C20.04 21.0402 20.98 20.1002 20.98 18.9702V17.2402C20.99 16.2402 20.22 15.3802 19.21 15.2702Z"
  />
</template>
