<template>
  <path
    d="M22 3.00024H2C0.9 3.00024 0 3.90024 0 5.00024V19.0002C0 20.1002 0.9 21.0002 2 21.0002H22C23.1 21.0002 23.99 20.1002 23.99 19.0002L24 5.00024C24 3.90024 23.1 3.00024 22 3.00024ZM8 6.00024C9.66 6.00024 11 7.34024 11 9.00024C11 10.6602 9.66 12.0002 8 12.0002C6.34 12.0002 5 10.6602 5 9.00024C5 7.34024 6.34 6.00024 8 6.00024ZM14 18.0002H2V17.0002C2 15.0002 6 13.9002 8 13.9002C10 13.9002 14 15.0002 14 17.0002V18.0002ZM17.85 14.0002H19.24C19.4 14.0002 19.54 14.0702 19.64 14.2002L20.74 15.6502C20.89 15.8502 20.87 16.1302 20.69 16.3002L19.33 17.6602C19.15 17.8402 18.85 17.8602 18.66 17.7002C17.53 16.7402 16.69 15.4502 16.28 13.9902C16.1 13.3602 16 12.6902 16 12.0002C16 11.3102 16.1 10.6402 16.28 10.0002C16.69 8.53024 17.53 7.25024 18.66 6.29024C18.86 6.12024 19.15 6.15024 19.33 6.33024L20.69 7.69024C20.87 7.87024 20.89 8.15024 20.74 8.34024L19.64 9.79024C19.55 9.92024 19.4 9.99024 19.24 9.99024H17.85C17.63 10.6202 17.5 11.2902 17.5 11.9902C17.5 12.6902 17.63 13.3702 17.85 14.0002Z"
  />
</template>
