<template>
  <path
    d="M3.63 3.63018C3.24 4.02018 3.24 4.65018 3.63 5.04018L7.29 8.70018L7 9.00018H4C3.45 9.00018 3 9.45018 3 10.0002V14.0002C3 14.5502 3.45 15.0002 4 15.0002H7L10.29 18.2902C10.92 18.9202 12 18.4702 12 17.5802V13.4102L16.18 17.5902C15.69 17.9602 15.16 18.2702 14.58 18.5002C14.22 18.6502 14 19.0302 14 19.4202C14 20.1402 14.73 20.6002 15.39 20.3302C16.19 20.0002 16.94 19.5602 17.61 19.0202L18.95 20.3602C19.34 20.7502 19.97 20.7502 20.36 20.3602C20.75 19.9702 20.75 19.3402 20.36 18.9502L5.05 3.63018C4.66 3.24018 4.03 3.24018 3.63 3.63018ZM19 12.0002C19 12.8202 18.85 13.6102 18.59 14.3402L20.12 15.8702C20.68 14.7002 21 13.3902 21 12.0002C21 8.17018 18.6 4.89018 15.22 3.60018C14.63 3.37018 14 3.83018 14 4.46018V4.65018C14 5.03018 14.25 5.36018 14.61 5.50018C17.18 6.54018 19 9.06018 19 12.0002ZM10.29 5.71018L10.12 5.88018L12 7.76018V6.41018C12 5.52018 10.92 5.08018 10.29 5.71018ZM16.5 12.0002C16.5 10.2302 15.48 8.71018 14 7.97018V9.76018L16.48 12.2402C16.49 12.1602 16.5 12.0802 16.5 12.0002Z"
  />
</template>
