<template>
  <g>
    <path
      d="M4 6.00018H20C20.55 6.00018 21 6.45018 21 7.00018V11.0002H23V6.00018C23 4.90018 22.1 4.00018 21 4.00018H3C1.9 4.00018 1 4.90018 1 6.00018V18.0002C1 19.1002 1.9 20.0002 3 20.0002H12V18.0002H4C3.45 18.0002 3 17.5502 3 17.0002V7.00018C3 6.45018 3.45 6.00018 4 6.00018Z"
    />
    <path d="M15 12.0002L9 8.00018V16.0002L15 12.0002Z" />
    <path
      d="M22.71 18.4302C22.74 18.1402 22.75 17.8502 22.72 17.5702L23.79 16.7202C23.89 16.6402 23.91 16.5102 23.85 16.4002L22.82 14.6102C22.76 14.5002 22.63 14.4602 22.51 14.5002L21.23 15.0002C21 14.8302 20.75 14.6902 20.48 14.5802L20.28 13.2202C20.26 13.0902 20.16 13.0002 20.03 13.0002H17.9599C17.84 13.0002 17.7299 13.0902 17.7099 13.2102L17.51 14.5702C17.25 14.6802 17 14.8302 16.77 14.9902L15.49 14.4902C15.37 14.4402 15.24 14.4902 15.18 14.6002L14.15 16.3902C14.09 16.5002 14.11 16.6302 14.21 16.7102L15.28 17.5702C15.25 17.8602 15.24 18.1502 15.27 18.4302L14.2 19.2802C14.1 19.3602 14.08 19.4902 14.14 19.6002L15.17 21.3902C15.23 21.5002 15.36 21.5402 15.48 21.5002L16.75 21.0002C16.98 21.1702 17.23 21.3102 17.5 21.4202L17.7 22.7802C17.72 22.9002 17.82 22.9902 17.95 22.9902H20.02C20.14 22.9902 20.25 22.9002 20.27 22.7802L20.47 21.4202C20.7299 21.3102 20.9799 21.1602 21.2099 21.0002L22.49 21.5002C22.61 21.5502 22.74 21.5002 22.8 21.3902L23.83 19.6002C23.89 19.4902 23.87 19.3602 23.77 19.2802L22.71 18.4302ZM19 19.5002C18.17 19.5002 17.5 18.8302 17.5 18.0002C17.5 17.1702 18.17 16.5002 19 16.5002C19.83 16.5002 20.5 17.1702 20.5 18.0002C20.5 18.8302 19.83 19.5002 19 19.5002Z"
    />
  </g>
</template>
