<template>
  <path
    d="M12.93 2.65018C12.73 2.45018 12.42 2.45018 12.22 2.65018L10.21 4.66018H14.93L12.93 2.65018ZM12.23 21.3502C12.43 21.5502 12.74 21.5502 12.94 21.3502L14.92 19.3702H10.26L12.23 21.3502ZM10.98 17.7302C11.58 17.7302 11.99 17.1302 11.77 16.5702L8.04002 7.03018C7.86002 6.57018 7.41002 6.27018 6.92002 6.27018C6.43002 6.27018 5.98002 6.57018 5.80002 7.03018L2.06002 16.5602C1.84002 17.1202 2.25002 17.7202 2.85002 17.7202C3.20002 17.7202 3.52002 17.5002 3.65002 17.1702L4.36002 15.2702H9.47002L10.18 17.1702C10.31 17.5102 10.63 17.7302 10.98 17.7302ZM4.97002 13.6402L6.91002 8.46018L8.85002 13.6402H4.97002ZM21.05 16.1402H15.72L21.44 7.85018C21.9 7.19018 21.42 6.28018 20.62 6.28018H14.14C13.7 6.28018 13.35 6.64018 13.35 7.08018V7.09018C13.35 7.53018 13.71 7.89018 14.14 7.89018H19.23L13.5 16.1702C13.04 16.8302 13.52 17.7402 14.32 17.7402H21.04C21.48 17.7402 21.83 17.3802 21.83 16.9502C21.85 16.5002 21.49 16.1402 21.05 16.1402Z"
  />
</template>
