<template>
  <path
    d="M12 5.00015V2.21015C12 1.76015 11.46 1.54015 11.15 1.86015L7.35003 5.65015C7.15003 5.85015 7.15003 6.16015 7.35003 6.36015L11.14 10.1502C11.46 10.4602 12 10.2402 12 9.79015V7.00015C15.73 7.00015 18.68 10.4202 17.86 14.2902C17.39 16.5502 15.72 18.2802 13.47 18.8202C9.83003 19.7002 6.54003 17.2202 6.05003 13.8602C5.99003 13.3702 5.57003 13.0002 5.08003 13.0002C4.48003 13.0002 4.00003 13.5302 4.08003 14.1302C4.71003 18.6002 9.02003 21.8802 13.85 20.8002C16.94 20.1102 19.24 17.7202 19.84 14.6102C20.84 9.48015 16.94 5.00015 12 5.00015ZM10.69 13.9002L10.94 11.7302H13.33V12.4402H11.63L11.52 13.3602C11.55 13.3402 11.59 13.3302 11.63 13.3102C11.67 13.2902 11.72 13.2702 11.78 13.2602C11.84 13.2502 11.9 13.2302 11.96 13.2202C12.02 13.2102 12.09 13.2002 12.16 13.2002C12.37 13.2002 12.55 13.2302 12.71 13.3002C12.87 13.3702 13.01 13.4602 13.12 13.5802C13.23 13.7002 13.32 13.8502 13.37 14.0302C13.42 14.2102 13.46 14.4102 13.46 14.6302C13.46 14.8202 13.43 15.0002 13.37 15.1702C13.31 15.3402 13.22 15.4902 13.1 15.6202C12.98 15.7502 12.83 15.8602 12.65 15.9302C12.47 16.0002 12.26 16.0502 12.01 16.0502C11.83 16.0502 11.65 16.0202 11.48 15.9702C11.31 15.9202 11.16 15.8302 11.02 15.7302C10.88 15.6302 10.78 15.4902 10.7 15.3402C10.62 15.1902 10.57 15.0102 10.57 14.8102H11.41C11.43 14.9902 11.49 15.1302 11.6 15.2202C11.71 15.3102 11.85 15.3702 12.02 15.3702C12.13 15.3702 12.22 15.3502 12.29 15.3102C12.36 15.2702 12.43 15.2102 12.47 15.1402C12.51 15.0702 12.55 14.9902 12.58 14.8902C12.61 14.7902 12.61 14.6902 12.61 14.5802C12.61 14.4702 12.6 14.3702 12.57 14.2702C12.54 14.1702 12.5 14.1002 12.44 14.0302C12.38 13.9602 12.31 13.9102 12.23 13.8802C12.15 13.8502 12.04 13.8302 11.93 13.8302C11.85 13.8302 11.78 13.8402 11.73 13.8502C11.68 13.8602 11.62 13.8802 11.58 13.9002C11.54 13.9202 11.5 13.9502 11.46 13.9702C11.42 13.9902 11.39 14.0302 11.36 14.0602L10.69 13.9002Z"
  />
</template>
