<template>
  <path
    d="M16.96 3.30018C16.64 2.91018 16.67 2.34018 17.03 1.98018L17.04 1.97018C17.46 1.55018 18.16 1.59018 18.53 2.05018C20.07 3.94018 21 6.36018 21 9.00018C21 11.5702 20.11 13.9402 18.64 15.8102L17.21 14.3802C18.33 12.8802 19 11.0202 19 9.00018C19 6.83018 18.23 4.84018 16.96 3.30018ZM7.49 4.66018C8.22999 4.24018 9.08 4.00018 10 4.00018C12.8 4.00018 15 6.20018 15 9.00018C15 9.80018 14.77 10.6902 14.37 11.5402L15.85 13.0202C15.87 12.9802 15.9 12.9402 15.93 12.8902C16.62 11.6502 17 10.2602 17 9.00018C17 5.07018 13.93 2.00018 10 2.00018C8.51 2.00018 7.15 2.44018 6.03 3.20018L7.49 4.66018ZM10 6.50018C9.79 6.50018 9.6 6.53018 9.41 6.58018L12.42 9.59018C12.47 9.40018 12.5 9.21018 12.5 9.00018C12.5 7.62018 11.38 6.50018 10 6.50018ZM20.49 20.4902L3.51 3.51018C3.12 3.12018 2.49 3.12018 2.1 3.51018C1.71 3.90018 1.71 4.53018 2.1 4.92018L3.52 6.34018C3.32 6.83018 3.17 7.34018 3.09 7.88018C2.99 8.47018 3.47 9.00018 4.06 9.00018H4.1C4.58 9.00018 4.99 8.65018 5.06 8.18018C5.08 8.10018 5.1 8.02018 5.12 7.95018L11.74 14.5702C10.86 15.2502 9.96 15.9802 9.47 17.4702C8.97 18.9702 8.47 19.4802 7.76 19.8502C7.56 19.9402 7.29 20.0002 7 20.0002C6.12 20.0002 5.37 19.4202 5.1 18.6302C4.97 18.2402 4.57 18.0002 4.15 18.0002C3.49 18.0002 3 18.6402 3.2 19.2602C3.73 20.8502 5.23 22.0002 7 22.0002C7.57 22.0002 8.13 21.8802 8.64 21.6502C10 20.9402 10.77 19.9202 11.37 18.1002C11.69 17.1202 12.27 16.6702 13.08 16.0502C13.11 16.0302 13.13 16.0102 13.16 15.9902L19.07 21.9002C19.46 22.2902 20.09 22.2902 20.48 21.9002C20.88 21.5102 20.88 20.8802 20.49 20.4902Z"
  />
</template>
