<template>
  <path
    d="M19 3.00018H5C3.9 3.00018 3 3.90018 3 5.00018V19.0002C3 20.1002 3.89 21.0002 5 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V5.00018C21 3.90018 20.11 3.00018 19 3.00018ZM12 12.7602C12 13.1702 11.66 13.5102 11.25 13.5102H11V14.2502C11 14.6602 10.66 15.0002 10.25 15.0002C9.84 15.0002 9.5 14.6602 9.5 14.2502V13.5002H7.5C6.95 13.5002 6.5 13.0502 6.5 12.5002V9.75018C6.5 9.34018 6.84 9.00018 7.25 9.00018C7.66 9.00018 8 9.34018 8 9.75018V12.0002H9.5V9.75018C9.5 9.34018 9.84 9.00018 10.25 9.00018C10.66 9.00018 11 9.34018 11 9.75018V12.0002H11.25C11.66 12.0002 12 12.3402 12 12.7502V12.7602ZM17.47 13.9002C17.69 14.2302 17.6 14.6702 17.27 14.8802C17.15 14.9602 17.01 15.0002 16.88 15.0002C16.65 15.0002 16.43 14.8902 16.29 14.6802L14.5 12.0002V14.2402C14.5 14.6502 14.16 14.9902 13.75 14.9902C13.34 15.0002 13 14.6602 13 14.2502V9.75018C13 9.34018 13.34 9.00018 13.75 9.00018C14.16 9.00018 14.5 9.34018 14.5 9.75018V11.9902L16.29 9.31018C16.51 8.98018 16.95 8.90018 17.27 9.11018C17.6 9.33018 17.68 9.77018 17.47 10.0902L16.2 12.0002L17.47 13.9002Z"
  />
</template>
