<template>
  <path
    d="M20 4.00018H4C2.89 4.00018 2.01 4.89018 2.01 6.00018L2 18.0002C2 19.1102 2.89 20.0002 4 20.0002H20C21.11 20.0002 22 19.1102 22 18.0002V6.00018C22 4.89018 21.11 4.00018 20 4.00018ZM8.5 14.2102C8.5 14.6402 8.14 15.0002 7.71 15.0002C7.46 15.0002 7.22 14.8802 7.07 14.6702L4.75 11.5002V14.3802C4.75 14.7302 4.47 15.0002 4.13 15.0002C3.79 15.0002 3.5 14.7202 3.5 14.3802V9.79018C3.5 9.36018 3.86 9.00018 4.29 9.00018H4.34C4.6 9.00018 4.84 9.12018 4.99 9.33018L7.25 12.5002V9.62018C7.25 9.28018 7.53 9.00018 7.88 9.00018C8.23 9.00018 8.5 9.28018 8.5 9.62018V14.2102ZM13.5 9.64018C13.5 9.99018 13.22 10.2602 12.88 10.2602H11V11.3802H12.88C13.23 11.3802 13.5 11.6602 13.5 12.0002V12.0102C13.5 12.3602 13.22 12.6302 12.88 12.6302H11V13.7402H12.88C13.23 13.7402 13.5 14.0202 13.5 14.3602C13.5 14.7102 13.22 14.9802 12.88 14.9802H10.35C9.88 14.9802 9.5 14.6002 9.5 14.1302V9.83018C9.5 9.38018 9.88 9.00018 10.35 9.00018H12.88C13.23 9.00018 13.5 9.28018 13.5 9.62018V9.64018ZM20.5 14.0002C20.5 14.5502 20.05 15.0002 19.5 15.0002H15.5C14.95 15.0002 14.5 14.5502 14.5 14.0002V9.62018C14.5 9.28018 14.78 9.00018 15.12 9.00018C15.46 9.00018 15.74 9.28018 15.74 9.62018V13.5102H16.87V10.6102C16.87 10.2602 17.15 9.99018 17.49 9.99018C17.83 9.99018 18.11 10.2702 18.11 10.6102V13.5002H19.23V9.62018C19.23 9.27018 19.51 9.00018 19.85 9.00018C20.19 9.00018 20.47 9.28018 20.47 9.62018V14.0002H20.5Z"
  />
</template>
