<template>
  <path
    d="M4.5 10.5002H6.5V13.5002H4.5V10.5002ZM17.5 10.5002H19.5V11.5002H17.5V10.5002ZM21 3.00018H3C1.89 3.00018 1 3.89018 1 5.00018V19.0002C1 20.1002 1.89 21.0002 3 21.0002H21C22.11 21.0002 23 20.1002 23 19.0002V5.00018C23 3.89018 22.11 3.00018 21 3.00018ZM8 13.5002C8 14.3302 7.33 15.0002 6.5 15.0002H3.5C3.22 15.0002 3 14.7802 3 14.5002V9.50018C3 9.22018 3.22 9.00018 3.5 9.00018H6.5C7.33 9.00018 8 9.67018 8 10.5002V13.5002ZM14.1 9.92018L12.83 14.2802C12.71 14.7102 12.31 15.0002 11.87 15.0002C11.43 15.0002 11.03 14.7102 10.91 14.2802L9.64 9.92018C9.5 9.46018 9.85 9.00018 10.33 9.00018C10.65 9.00018 10.93 9.21018 11.02 9.52018L11.87 12.4302L12.72 9.52018C12.81 9.21018 13.09 9.00018 13.41 9.00018C13.89 9.00018 14.24 9.46018 14.1 9.92018ZM21 11.5002C21 12.1002 20.6 12.6502 20.1 12.9002L20.73 14.3802C20.92 14.8302 20.59 15.3402 20.1 15.3402C19.82 15.3402 19.57 15.1802 19.47 14.9202L18.65 13.0002H17.5V14.3102C17.5 14.6902 17.19 15.0002 16.81 15.0002H16.69C16.31 15.0002 16 14.6902 16 14.3102V9.64018C16 9.29018 16.29 9.00018 16.64 9.00018H19.5C20.33 9.00018 21 9.67018 21 10.5002V11.5002Z"
  />
</template>
