<template>
  <path
    d="M6.83 4.00016H19C20.1 4.00016 21 4.90016 21 6.00016V18.0002C21 18.0502 20.99 18.1002 20.98 18.1602L17.6 14.7802C17.84 14.5902 18 14.3202 18 14.0002V13.5002C18 13.2202 17.78 13.0002 17.5 13.0002H17C16.72 13.0002 16.5 13.2202 16.5 13.5002H16.33L14.5 11.6702V10.5002H16.5C16.5 10.7802 16.72 11.0002 17 11.0002H17.5C17.78 11.0002 18 10.7802 18 10.5002V10.0002C18 9.45016 17.55 9.00016 17 9.00016H14C13.45 9.00016 13 9.45016 13 10.0002V10.1702L6.83 4.00016ZM20.49 21.9002C20.1 22.2902 19.47 22.2902 19.08 21.9002L17.18 20.0002H5C3.89 20.0002 3 19.1002 3 18.0002V6.00016C3 5.95016 3.02 5.90016 3.02 5.85016L2.1 4.93016C1.71 4.54016 1.71 3.91016 2.1 3.52016C2.49 3.13016 3.12 3.13016 3.51 3.52016L20.48 20.4902C20.88 20.8802 20.88 21.5102 20.49 21.9002ZM11 13.8302L10.17 13.0002H10C9.72 13.0002 9.5 13.2202 9.5 13.5002H7.5V10.5002H7.67L6.4 9.22016C6.16 9.41016 6 9.68016 6 10.0002V14.0002C6 14.5502 6.45 15.0002 7 15.0002H10C10.55 15.0002 11 14.5502 11 14.0002V13.8302Z"
  />
</template>
