<template>
  <path
    d="M15.72 6.41029C15.37 6.76029 15.28 7.29029 15.47 7.76029C15.77 8.51029 15.79 9.34029 15.52 10.1003C15.36 10.5603 15.46 11.0803 15.81 11.4203C16.41 12.0203 17.47 11.8903 17.83 11.1103C18.47 9.72029 18.43 8.12029 17.71 6.70029C17.31 5.95029 16.3 5.82029 15.72 6.41029ZM19.18 2.89029C18.78 3.29029 18.72 3.91029 19.05 4.37029C20.98 7.05029 21 10.6203 19.14 13.4403C18.83 13.9003 18.91 14.5203 19.3 14.9103C19.81 15.4203 20.68 15.3703 21.11 14.7803C23.68 11.2703 23.63 6.58029 20.94 3.01029C20.51 2.45029 19.68 2.39029 19.18 2.89029ZM9.43 5.04029L12.96 8.57029C12.76 6.71029 11.29 5.24029 9.43 5.04029ZM3.71 3.56029C3.32 3.95029 3.32 4.58029 3.71 4.97029L5.62 6.88029C5.06 7.77029 4.83 8.89029 5.15 10.0803C5.51 11.4103 6.59 12.4803 7.92 12.8503C9.11 13.1803 10.23 12.9403 11.12 12.3803L15.52 16.7803C13.74 15.6003 10.78 15.0003 9 15.0003C6.33 15.0003 1 16.3403 1 19.0003V20.0003C1 20.5503 1.45 21.0003 2 21.0003H16C16.55 21.0003 17 20.5503 17 20.0003V19.0003C17 18.6303 16.89 18.3003 16.71 17.9803L19.02 20.2903C19.41 20.6803 20.04 20.6803 20.43 20.2903C20.82 19.9003 20.82 19.2703 20.43 18.8803L5.12 3.56029C4.73 3.17029 4.1 3.17029 3.71 3.56029Z"
  />
</template>
