<template>
  <path
    d="M12.65 15.6702C12.79 15.3102 12.7 14.9002 12.42 14.6202L10.33 12.5602L10.36 12.5302C12.1 10.5902 13.34 8.36024 14.07 6.00024H16.01C16.55 6.00024 17 5.55024 17 5.01024V4.99024C17 4.45024 16.55 4.00024 16.01 4.00024H10V3.00024C10 2.45024 9.55 2.00024 9 2.00024C8.45 2.00024 8 2.45024 8 3.00024V4.00024H1.99C1.45 4.00024 1 4.45024 1 4.99024C1 5.54024 1.45 5.98024 1.99 5.98024H12.17C11.5 7.92024 10.44 9.75024 9 11.3502C8.19 10.4602 7.51 9.49024 6.94 8.47024C6.78 8.18024 6.49 8.00024 6.16 8.00024C5.47 8.00024 5.03 8.75024 5.37 9.35024C6 10.4802 6.77 11.5602 7.67 12.5602L3.3 16.8702C2.9 17.2602 2.9 17.9002 3.3 18.2902C3.69 18.6802 4.32 18.6802 4.72 18.2902L9 14.0002L11.02 16.0202C11.53 16.5302 12.4 16.3402 12.65 15.6702ZM17.5 10.0002C16.9 10.0002 16.36 10.3702 16.15 10.9402L12.48 20.7402C12.24 21.3502 12.7 22.0002 13.35 22.0002C13.74 22.0002 14.09 21.7602 14.23 21.3902L15.12 19.0002H19.87L20.77 21.3902C20.91 21.7502 21.26 22.0002 21.65 22.0002C22.3 22.0002 22.76 21.3502 22.53 20.7402L18.86 10.9402C18.64 10.3702 18.1 10.0002 17.5 10.0002ZM15.88 17.0002L17.5 12.6702L19.12 17.0002H15.88Z"
  />
</template>
