<template>
  <path
    d="M18.32 5.6803C17.96 6.0403 17.93 6.6003 18.25 7.0003C19.7 8.8203 20.46 11.3103 19.78 13.9203C18.99 16.9703 16.6 19.2503 13.57 19.8603C8.47002 20.8703 4.00002 16.9303 4.00002 12.0003C4.00002 7.9203 7.05002 4.5603 11 4.0703V6.0903C7.87002 6.6203 5.57002 9.5503 6.07002 12.9203C6.46002 15.5303 8.63002 17.6303 11.25 17.9503C14.89 18.4003 18 15.5603 18 12.0003C18 10.7503 17.62 9.6003 16.97 8.6403C16.63 8.1403 15.9 8.11029 15.47 8.53029L15.46 8.5403C15.12 8.8803 15.09 9.4103 15.35 9.8103C15.95 10.7303 16.19 11.9103 15.84 13.1303C15.45 14.5003 14.3 15.5903 12.9 15.9003C10.3 16.4703 8.00002 14.5103 8.00002 12.0003C8.00002 10.1403 9.28002 8.5903 11 8.1403V10.2803C10.4 10.6303 10 11.2603 10 12.0003C10 13.1003 10.9 14.0003 12 14.0003C13.1 14.0003 14 13.1003 14 12.0003C14 11.2603 13.6 10.6203 13 10.2803V2.7103C13 2.3203 12.68 2.0003 12.29 2.0003C6.93002 1.8003 2.31002 6.0603 2.02002 11.4003C1.66002 17.9503 7.43002 23.2203 14.03 21.8003C17.91 20.9703 20.91 18.0003 21.78 14.1303C22.49 10.9703 21.58 7.9703 19.81 5.7603C19.44 5.2903 18.74 5.2603 18.32 5.6803Z"
  />
</template>
