<template>
  <path
    d="M10.88 21.9402L16.41 16.4002C16.78 16.0302 16.99 15.5202 16.99 14.9902V5.00024C16.99 3.90024 16.09 3.00024 14.99 3.00024H6.00002C5.20002 3.00024 4.48002 3.48024 4.17002 4.21024L0.910022 11.8202C0.0600216 13.8002 1.51002 16.0002 3.66002 16.0002H9.31002L8.36002 20.5802C8.26002 21.0802 8.41002 21.5902 8.77002 21.9502C9.36002 22.5302 10.3 22.5302 10.88 21.9402ZM21 3.00024C19.9 3.00024 19 3.90024 19 5.00024V13.0002C19 14.1002 19.9 15.0002 21 15.0002C22.1 15.0002 23 14.1002 23 13.0002V5.00024C23 3.90024 22.1 3.00024 21 3.00024Z"
  />
</template>
