<template>
  <path
    d="M20.65 17.6502L18.86 15.8602C18.54 15.5402 18 15.7602 18 16.2102V17.0002H6C5.45 17.0002 5 17.4502 5 18.0002C5 18.5502 5.45 19.0002 6 19.0002H18V19.7902C18 20.2402 18.54 20.4602 18.85 20.1402L20.64 18.3502C20.84 18.1602 20.84 17.8402 20.65 17.6502ZM9.5 11.8002H14.5L15.16 13.4002C15.31 13.7602 15.66 14.0002 16.05 14.0002C16.74 14.0002 17.2 13.2902 16.93 12.6602L13.05 3.69024C12.87 3.27024 12.46 3.00024 12 3.00024C11.54 3.00024 11.13 3.27024 10.95 3.69024L7.07 12.6602C6.8 13.2902 7.27 14.0002 7.96 14.0002C8.35 14.0002 8.7 13.7602 8.85 13.4002L9.5 11.8002ZM12 4.98024L13.87 10.0002H10.13L12 4.98024Z"
  />
</template>
