<template>
  <path
    d="M18.35 4.3502C18.15 4.1502 17.84 4.1502 17.64 4.3502L15.85 6.1402C15.54 6.4602 15.76 7.0002 16.21 7.0002H17V19.0002C17 19.5502 17.45 20.0002 18 20.0002C18.55 20.0002 19 19.5502 19 19.0002V7.0002H19.79C20.24 7.0002 20.46 6.4602 20.14 6.1502L18.35 4.3502ZM11.8 15.5002V10.5002L13.4 9.8402C13.76 9.7002 14 9.3502 14 8.9602C14 8.2702 13.29 7.8102 12.66 8.0802L3.69 11.9602C3.27 12.1302 3 12.5402 3 13.0002C3 13.4602 3.27 13.8702 3.69 14.0502L12.66 17.9302C13.29 18.2002 14 17.7302 14 17.0402C14 16.6502 13.76 16.3002 13.4 16.1502L11.8 15.5002ZM4.98 13.0002L10 11.1302V14.8702L4.98 13.0002Z"
  />
</template>
