<template>
  <path
    d="M6.14003 11.8602L3.36003 14.6502C3.17003 14.8502 3.17003 15.1602 3.36003 15.3602L6.14003 18.1502C6.45003 18.4702 6.99003 18.2402 6.99003 17.8002V16.0002H13C13.55 16.0002 14 15.5502 14 15.0002C14 14.4502 13.55 14.0002 13 14.0002H6.99003V12.2102C6.99003 11.7602 6.45003 11.5402 6.14003 11.8602ZM20.65 8.65021L17.87 5.86021C17.56 5.54021 17.02 5.77021 17.02 6.21021V8.00021H11C10.45 8.00021 10 8.45021 10 9.00021C10 9.55021 10.45 10.0002 11 10.0002H17.01V11.7902C17.01 12.2402 17.55 12.4602 17.86 12.1402L20.64 9.35021C20.84 9.16021 20.84 8.84021 20.65 8.65021Z"
  />
</template>
