<template>
  <path
    d="M12 2.00024C6.48 2.00024 2 6.48024 2 12.0002C2 17.5202 6.48 22.0002 12 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48024 17.52 2.00024 12 2.00024ZM15.61 8.34024C16.68 8.34024 17.54 9.20024 17.54 10.2702C17.54 11.3402 16.68 12.2002 15.61 12.2002C14.54 12.2002 13.68 11.3402 13.68 10.2702C13.67 9.20024 14.54 8.34024 15.61 8.34024ZM9.61 6.76024C10.91 6.76024 11.97 7.82024 11.97 9.12024C11.97 10.4202 10.91 11.4802 9.61 11.4802C8.31 11.4802 7.25 10.4202 7.25 9.12024C7.25 7.81024 8.3 6.76024 9.61 6.76024ZM9.61 15.8902V19.6402C7.21 18.8902 5.31 17.0402 4.47 14.6802C5.52 13.5602 8.14 12.9902 9.61 12.9902C10.14 12.9902 10.81 13.0702 11.51 13.2102C9.87 14.0802 9.61 15.2302 9.61 15.8902ZM12 20.0002C11.73 20.0002 11.47 19.9902 11.21 19.9602V15.8902C11.21 14.4702 14.15 13.7602 15.61 13.7602C16.68 13.7602 18.53 14.1502 19.45 14.9102C18.28 17.8802 15.39 20.0002 12 20.0002Z"
  />
</template>
