<template>
  <path
    d="M22 9.00024V15.0002C22 16.1002 21.1 17.0002 20 17.0002H19V15.0002H20V9.00024H4V15.0002H10V17.0002H4C2.9 17.0002 2 16.1002 2 15.0002V9.00024C2 7.90024 2.9 7.00024 4 7.00024H20C21.1 7.00024 22 7.90024 22 9.00024ZM14.04 17.9902C14.22 18.3802 14.77 18.3802 14.95 17.9902L15.58 16.5902L16.98 15.9602C17.37 15.7802 17.37 15.2302 16.98 15.0502L15.58 14.4202L14.95 13.0202C14.77 12.6302 14.22 12.6302 14.04 13.0202L13.41 14.4202L12.01 15.0502C11.62 15.2302 11.62 15.7802 12.01 15.9602L13.41 16.5902L14.04 17.9902ZM16.74 13.4302C16.84 13.6502 17.16 13.6502 17.26 13.4302L17.62 12.6302L18.42 12.2702C18.64 12.1702 18.64 11.8502 18.42 11.7502L17.62 11.3902L17.26 10.5902C17.16 10.3702 16.84 10.3702 16.74 10.5902L16.38 11.3902L15.58 11.7502C15.36 11.8502 15.36 12.1702 15.58 12.2702L16.38 12.6302L16.74 13.4302Z"
  />
</template>
