<template>
  <g>
    <path
      d="M15.5 14.0002H14.71L14.43 13.7302C15.63 12.3302 16.25 10.4202 15.91 8.39021C15.44 5.61021 13.12 3.40021 10.33 3.05021C6.54003 2.58021 3.30003 5.38021 3.03003 9.00021H5.05003C5.29003 6.88021 6.97003 5.20021 9.11003 5.02021C11.65 4.80021 14 6.95021 14 9.50021C14 11.9902 11.99 14.0002 9.50003 14.0002C9.33003 14.0002 9.17003 13.9702 9.00003 13.9502V15.9702C9.00003 15.9702 9.00003 15.9702 9.01003 15.9802C10.81 16.1102 12.48 15.5102 13.73 14.4302L14 14.7102V15.5002L18.25 19.7502C18.66 20.1602 19.33 20.1602 19.74 19.7502C20.15 19.3402 20.15 18.6702 19.74 18.2602L15.5 14.0002Z"
    />
    <path
      d="M6.12002 11.1702L4.00002 13.2902L1.88002 11.1702C1.68002 10.9702 1.37002 10.9702 1.17002 11.1702C0.97002 11.3702 0.97002 11.6802 1.17002 11.8802L3.29002 14.0002L1.17002 16.1202C0.97002 16.3202 0.97002 16.6302 1.17002 16.8302C1.37002 17.0302 1.68002 17.0302 1.88002 16.8302L4.00002 14.7102L6.12002 16.8302C6.32002 17.0302 6.63002 17.0302 6.83002 16.8302C7.03002 16.6302 7.03002 16.3202 6.83002 16.1202L4.71002 14.0002L6.83002 11.8802C7.03002 11.6802 7.03002 11.3702 6.83002 11.1702C6.63002 10.9802 6.32002 10.9802 6.12002 11.1702Z"
    />
  </g>
</template>
