<template>
  <path
    d="M15.83 10.2902L13.71 8.17021C13.32 7.78021 13.32 7.15021 13.71 6.76021C14.1 6.37021 14.73 6.37021 15.12 6.76021L16.53 8.17021L20.07 4.63021C20.46 4.24021 21.09 4.24021 21.48 4.63021C21.87 5.02021 21.87 5.65021 21.48 6.04021L17.24 10.2802C16.85 10.6802 16.22 10.6802 15.83 10.2902ZM10 7.00021H3C2.45 7.00021 2 7.45021 2 8.00021C2 8.55021 2.45 9.00021 3 9.00021H10C10.55 9.00021 11 8.55021 11 8.00021C11 7.45021 10.55 7.00021 10 7.00021ZM20.29 12.7102C19.9 12.3202 19.27 12.3202 18.88 12.7102L17 14.5902L15.12 12.7102C14.73 12.3202 14.1 12.3202 13.71 12.7102C13.32 13.1002 13.32 13.7302 13.71 14.1202L15.59 16.0002L13.71 17.8802C13.32 18.2702 13.32 18.9002 13.71 19.2902C14.1 19.6802 14.73 19.6802 15.12 19.2902L17 17.4102L18.88 19.2902C19.27 19.6802 19.9 19.6802 20.29 19.2902C20.68 18.9002 20.68 18.2702 20.29 17.8802L18.41 16.0002L20.29 14.1202C20.68 13.7302 20.68 13.1002 20.29 12.7102ZM10 15.0002H3C2.45 15.0002 2 15.4502 2 16.0002C2 16.5502 2.45 17.0002 3 17.0002H10C10.55 17.0002 11 16.5502 11 16.0002C11 15.4502 10.55 15.0002 10 15.0002Z"
  />
</template>
