<template>
  <path
    d="M4.75 18.2502C4.34 18.6602 4.34 19.3402 4.75 19.7502C5.16 20.1602 5.84 20.1602 6.25 19.7502L9 17.0002H11L8.5 14.5002L4.75 18.2502ZM15 5.00018C16.1 5.00018 17 4.10018 17 3.00018C17 1.90018 16.1 1.00018 15 1.00018C13.9 1.00018 13 1.90018 13 3.00018C13 4.10018 13.9 5.00018 15 5.00018ZM20.29 20.3002L18.29 18.2902C18.11 18.1102 17.85 18.0002 17.58 18.0002H16.5L10.21 11.7102C11 11.3802 11.87 10.8402 12.5 10.3202V12.5902L16.08 16.1702C16.65 15.6202 17 14.8502 17 14.0102V8.26018C17 7.02018 15.98 6.00018 14.74 6.00018H14.72C14.38 6.00018 14.05 6.09018 13.76 6.23018C13.5 6.35018 13.26 6.52018 13.07 6.73018L11.67 8.28018C10.61 9.45018 8.66 10.3502 7 10.3202C6.4 10.3202 5.92 10.8002 5.92 11.4002C5.92 12.0002 6.4 12.4802 7 12.4802C7.31 12.4802 7.61 12.4502 7.9 12.4102L15.01 19.5002V20.5802C15.01 20.8402 15.11 21.1002 15.3 21.2802L17.29 23.2902C17.68 23.6802 18.31 23.6802 18.71 23.2902L20.29 21.7102C20.68 21.3302 20.68 20.6902 20.29 20.3002Z"
  />
</template>
