<template>
  <path
    d="M13.25 3.0002C8.16002 2.8602 3.99002 6.9402 3.99002 12.0002H2.20002C1.75002 12.0002 1.53002 12.5402 1.85002 12.8502L4.64002 15.6502C4.84002 15.8502 5.15002 15.8502 5.35002 15.6502L8.14002 12.8502C8.46002 12.5402 8.23002 12.0002 7.79002 12.0002H5.99002C5.99002 8.1002 9.17002 4.9502 13.09 5.0002C16.81 5.0502 19.94 8.1802 19.99 11.9002C20.04 15.8102 16.89 19.0002 12.99 19.0002C11.38 19.0002 9.89002 18.4502 8.71002 17.5202C8.31002 17.2102 7.75002 17.2402 7.39002 17.6002C6.97002 18.0302 7.00002 18.7302 7.47002 19.1002C8.99002 20.2902 10.91 21.0002 12.99 21.0002C18.04 21.0002 22.13 16.8302 21.99 11.7402C21.86 7.0502 17.94 3.1302 13.25 3.0002ZM12.74 8.0002C12.33 8.0002 11.99 8.3402 11.99 8.7502V12.4302C11.99 12.7802 12.18 13.1102 12.48 13.2902L15.6 15.1402C15.96 15.3502 16.42 15.2302 16.63 14.8802C16.84 14.5202 16.72 14.0602 16.37 13.8502L13.49 12.1402V8.7402C13.49 8.3402 13.16 8.0002 12.74 8.0002Z"
  />
</template>
