<template>
  <path
    d="M16.95 10.2302L11.29 15.8902C10.9 16.2802 10.27 16.2802 9.88 15.8902L7.05 13.0602C6.66 12.6702 6.66 12.0402 7.05 11.6502C7.44 11.2602 8.07 11.2602 8.46 11.6502L10.58 13.7702L15.53 8.82019C15.92 8.43019 16.55 8.43019 16.94 8.82019C17.34 9.21019 17.34 9.84019 16.95 10.2302ZM4 12.0002C4 9.67019 5.02 7.58019 6.62 6.12019L8.15 7.65019C8.46 7.96019 9 7.74019 9 7.29019V3.00019C9 2.72019 8.78 2.50019 8.5 2.50019H4.21C3.76 2.50019 3.54 3.04019 3.86 3.35019L5.2 4.70019C3.24 6.52019 2 9.11019 2 12.0002C2 16.7502 5.32 20.7302 9.76 21.7502C10.39 21.8902 11 21.4202 11 20.7702C11 20.3002 10.67 19.9002 10.21 19.7902C6.66 18.9802 4 15.8002 4 12.0002ZM22 12.0002C22 7.25019 18.68 3.27019 14.24 2.25019C13.61 2.11019 13 2.58019 13 3.23019C13 3.70019 13.33 4.10019 13.79 4.21019C17.34 5.02019 20 8.20019 20 12.0002C20 14.3302 18.98 16.4202 17.38 17.8802L15.85 16.3502C15.54 16.0402 15 16.2602 15 16.7102V21.0002C15 21.2802 15.22 21.5002 15.5 21.5002H19.79C20.24 21.5002 20.46 20.9602 20.14 20.6502L18.8 19.3002C20.76 17.4802 22 14.8902 22 12.0002Z"
  />
</template>
