<template>
  <path
    d="M18.99 11.5002C19.33 11.5002 19.67 11.5302 20 11.5702V2.42021C20 1.53021 18.92 1.08021 18.29 1.71021L1.70999 18.2902C1.07999 18.9202 1.51999 20.0002 2.40999 20.0002H11.56C11.52 19.6702 11.49 19.3402 11.49 19.0002C11.49 14.8602 14.85 11.5002 18.99 11.5002ZM22.7 19.4902C22.72 19.3302 22.74 19.1702 22.74 19.0002C22.74 18.8302 22.73 18.6702 22.7 18.5102L23.76 17.6802C23.85 17.6002 23.88 17.4702 23.82 17.3602L22.82 15.6302C22.76 15.5202 22.63 15.4802 22.51 15.5202L21.27 16.0202C21.01 15.8202 20.73 15.6502 20.42 15.5302L20.23 14.2102C20.22 14.0902 20.11 14.0002 19.99 14.0002H17.99C17.87 14.0002 17.76 14.0902 17.74 14.2102L17.55 15.5302C17.25 15.6602 16.96 15.8202 16.7 16.0202L15.46 15.5202C15.35 15.4802 15.22 15.5202 15.15 15.6302L14.15 17.3602C14.09 17.4702 14.11 17.6002 14.21 17.6802L15.27 18.5102C15.25 18.6702 15.24 18.8302 15.24 19.0002C15.24 19.1702 15.25 19.3302 15.27 19.4902L14.21 20.3202C14.12 20.4002 14.09 20.5302 14.15 20.6402L15.15 22.3702C15.21 22.4802 15.34 22.5202 15.46 22.4802L16.7 21.9802C16.96 22.1802 17.24 22.3502 17.55 22.4702L17.74 23.7902C17.76 23.9102 17.86 24.0002 17.99 24.0002H19.99C20.11 24.0002 20.22 23.9102 20.24 23.7902L20.43 22.4702C20.73 22.3402 21.02 22.1802 21.27 21.9802L22.52 22.4802C22.63 22.5202 22.76 22.4802 22.83 22.3702L23.83 20.6402C23.89 20.5302 23.86 20.4002 23.77 20.3202L22.7 19.4902ZM18.99 20.5002C18.16 20.5002 17.49 19.8302 17.49 19.0002C17.49 18.1702 18.16 17.5002 18.99 17.5002C19.82 17.5002 20.49 18.1702 20.49 19.0002C20.49 19.8302 19.82 20.5002 18.99 20.5002Z"
  />
</template>
