<template>
  <path
    d="M10.5 9.00021H13.5C13.78 9.00021 14 8.78021 14 8.50021V6.00021H15.79C16.24 6.00021 16.46 5.46021 16.14 5.15021L12.35 1.36021C12.15 1.16021 11.84 1.16021 11.64 1.36021L7.85002 5.15021C7.54002 5.46021 7.76002 6.00021 8.21002 6.00021H10V8.50021C10 8.78021 10.22 9.00021 10.5 9.00021ZM8.50002 10.0002H6.00002V8.21021C6.00002 7.76021 5.46002 7.54021 5.15002 7.86021L1.36002 11.6502C1.16002 11.8502 1.16002 12.1602 1.36002 12.3602L5.15002 16.1502C5.46002 16.4602 6.00002 16.2402 6.00002 15.7902V14.0002H8.50002C8.78002 14.0002 9.00002 13.7802 9.00002 13.5002V10.5002C9.00002 10.2202 8.78002 10.0002 8.50002 10.0002ZM22.65 11.6502L18.86 7.86021C18.54 7.54021 18 7.76021 18 8.21021V10.0002H15.5C15.22 10.0002 15 10.2202 15 10.5002V13.5002C15 13.7802 15.22 14.0002 15.5 14.0002H18V15.7902C18 16.2402 18.54 16.4602 18.85 16.1402L22.64 12.3502C22.84 12.1602 22.84 11.8402 22.65 11.6502ZM13.5 15.0002H10.5C10.22 15.0002 10 15.2202 10 15.5002V18.0002H8.21002C7.76002 18.0002 7.54002 18.5402 7.86002 18.8502L11.65 22.6402C11.85 22.8402 12.16 22.8402 12.36 22.6402L16.15 18.8502C16.46 18.5402 16.24 18.0002 15.8 18.0002H14V15.5002C14 15.2202 13.78 15.0002 13.5 15.0002Z"
  />
</template>
