<template>
  <path
    d="M18 13.0002H12.94C12.6 16.1002 10.68 18.7202 8.00004 20.0502C7.97004 21.8602 6.34004 23.2802 4.45004 22.9502C3.25004 22.7402 2.26004 21.7502 2.05004 20.5502C1.71004 18.6502 3.16004 17.0002 5.00004 17.0002C5.95004 17.0002 6.78004 17.4502 7.33004 18.1402C9.23004 17.1102 10.59 15.2302 10.91 13.0002H7.81004C7.33004 14.3402 5.95004 15.2402 4.39004 14.9402C3.21004 14.7102 2.26004 13.7402 2.04004 12.5602C1.70004 10.6602 3.16004 9.00018 5.00004 9.00018C6.30004 9.00018 7.40004 9.84018 7.82004 11.0002H10.92C10.6 8.77018 9.23004 6.90018 7.33004 5.86018C6.69004 6.66018 5.66004 7.14018 4.52004 6.96018C3.29004 6.77018 2.26004 5.77018 2.05004 4.54018C1.72004 2.65018 3.17004 1.00018 5.00004 1.00018C6.64004 1.00018 7.96004 2.31018 7.99004 3.95018C10.67 5.28018 12.59 7.90018 12.93 11.0002H18V9.21018C18 8.76018 18.54 8.54018 18.85 8.86018L21.64 11.6502C21.84 11.8502 21.84 12.1602 21.64 12.3602L18.85 15.1502C18.54 15.4602 18 15.2402 18 14.7902V13.0002Z"
  />
</template>
