<template>
  <path
    d="M21.41 11.5802L12.41 2.58018C12.05 2.22018 11.55 2.00018 11 2.00018H4C2.9 2.00018 2 2.90018 2 4.00018V11.0002C2 11.5502 2.22 12.0502 2.59 12.4202L11.59 21.4202C11.95 21.7802 12.45 22.0002 13 22.0002C13.55 22.0002 14.05 21.7802 14.41 21.4102L21.41 14.4102C21.78 14.0502 22 13.5502 22 13.0002C22 12.4502 21.77 11.9402 21.41 11.5802ZM5.5 7.00018C4.67 7.00018 4 6.33018 4 5.50018C4 4.67018 4.67 4.00018 5.5 4.00018C6.33 4.00018 7 4.67018 7 5.50018C7 6.33018 6.33 7.00018 5.5 7.00018ZM17.27 15.2702L13.35 19.1902C13.15 19.3902 12.84 19.3902 12.64 19.1902L8.72 15.2702C8.15 14.6902 7.85 13.8402 8.05 12.9302C8.24 12.0502 8.94 11.3202 9.81 11.0902C10.75 10.8402 11.66 11.1302 12.25 11.7402L13 12.4602L13.73 11.7302C14.18 11.2802 14.81 11.0002 15.5 11.0002C16.88 11.0002 18 12.1202 18 13.5002C18 14.1902 17.72 14.8202 17.27 15.2702Z"
  />
</template>
