<template>
  <path
    d="M11.99 2.00018C6.47 2.00018 2 6.48018 2 12.0002C2 17.5202 6.47 22.0002 11.99 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48018 17.52 2.00018 11.99 2.00018ZM18.92 8.00018H15.97C15.65 6.75018 15.19 5.55018 14.59 4.44018C16.43 5.07018 17.96 6.35018 18.92 8.00018ZM12 4.04018C12.83 5.24018 13.48 6.57018 13.91 8.00018H10.09C10.52 6.57018 11.17 5.24018 12 4.04018ZM4.26 14.0002C4.1 13.3602 4 12.6902 4 12.0002C4 11.3102 4.1 10.6402 4.26 10.0002H7.64C7.56 10.6602 7.5 11.3202 7.5 12.0002C7.5 12.6802 7.56 13.3402 7.64 14.0002H4.26ZM5.08 16.0002H8.03C8.35 17.2502 8.81 18.4502 9.41 19.5602C7.57 18.9302 6.04 17.6602 5.08 16.0002ZM8.03 8.00018H5.08C6.04 6.34018 7.57 5.07018 9.41 4.44018C8.81 5.55018 8.35 6.75018 8.03 8.00018ZM12 19.9602C11.17 18.7602 10.52 17.4302 10.09 16.0002H13.91C13.48 17.4302 12.83 18.7602 12 19.9602ZM14.34 14.0002H9.66C9.57 13.3402 9.5 12.6802 9.5 12.0002C9.5 11.3202 9.57 10.6502 9.66 10.0002H14.34C14.43 10.6502 14.5 11.3202 14.5 12.0002C14.5 12.6802 14.43 13.3402 14.34 14.0002ZM14.59 19.5602C15.19 18.4502 15.65 17.2502 15.97 16.0002H18.92C17.96 17.6502 16.43 18.9302 14.59 19.5602ZM16.36 14.0002C16.44 13.3402 16.5 12.6802 16.5 12.0002C16.5 11.3202 16.44 10.6602 16.36 10.0002H19.74C19.9 10.6402 20 11.3102 20 12.0002C20 12.6902 19.9 13.3602 19.74 14.0002H16.36Z"
  />
</template>
