<template>
  <path
    d="M19 3.00018H14.82C14.4 1.84018 13.3 1.00018 12 1.00018C10.7 1.00018 9.6 1.84018 9.18 3.00018H5C4.86 3.00018 4.73 3.01018 4.6 3.04018C4.21 3.12018 3.86 3.32018 3.59 3.59018C3.41 3.77018 3.26 3.99018 3.16 4.23018C3.06 4.46018 3 4.72018 3 5.00018V19.0002C3 19.2702 3.06 19.5402 3.16 19.7802C3.26 20.0202 3.41 20.2302 3.59 20.4202C3.86 20.6902 4.21 20.8902 4.6 20.9702C4.73 20.9902 4.86 21.0002 5 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V5.00018C21 3.90018 20.1 3.00018 19 3.00018ZM10.3 14.8802C9.91 15.2702 9.27 15.2702 8.88 14.8802L6.71 12.7102C6.32 12.3202 6.32 11.6902 6.71 11.3002L8.88 9.13018C9.27 8.74018 9.91 8.74018 10.3 9.13018C10.69 9.52018 10.69 10.1502 10.3 10.5402L8.83 12.0002L10.29 13.4602C10.68 13.8502 10.69 14.4902 10.3 14.8802ZM12 4.25018C11.59 4.25018 11.25 3.91018 11.25 3.50018C11.25 3.09018 11.59 2.75018 12 2.75018C12.41 2.75018 12.75 3.09018 12.75 3.50018C12.75 3.91018 12.41 4.25018 12 4.25018ZM13.7 14.8802C13.31 14.4902 13.31 13.8602 13.7 13.4702L15.17 12.0002L13.7 10.5302C13.31 10.1402 13.31 9.51018 13.7 9.12018C14.09 8.73018 14.73 8.73018 15.12 9.12018L17.29 11.2902C17.68 11.6802 17.68 12.3102 17.29 12.7002L15.12 14.8702C14.73 15.2702 14.09 15.2702 13.7 14.8802Z"
  />
</template>
