<template>
  <path
    d="M12 2.00018C6.48 2.00018 2 6.48018 2 12.0002C2 17.5202 6.48 22.0002 12 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48018 17.52 2.00018 12 2.00018ZM13 19.0002H11V17.0002H13V19.0002ZM15.07 11.2502L14.17 12.1702C13.67 12.6802 13.31 13.1402 13.13 13.8602C13.05 14.1802 13 14.5402 13 15.0002H11V14.5002C11 14.0402 11.08 13.6002 11.22 13.1902C11.42 12.6102 11.75 12.0902 12.17 11.6702L13.41 10.4102C13.87 9.97018 14.09 9.31018 13.96 8.61018C13.83 7.89018 13.27 7.28018 12.57 7.08018C11.46 6.77018 10.43 7.40018 10.1 8.35018C9.98 8.72018 9.67 9.00018 9.28 9.00018H8.98C8.4 9.00018 8 8.44018 8.16 7.88018C8.59 6.41018 9.84 5.29018 11.39 5.05018C12.91 4.81018 14.36 5.60018 15.26 6.85018C16.44 8.48018 16.09 10.2302 15.07 11.2502Z"
  />
</template>
