<template>
  <path
    d="M2 21.0002H12C12.55 21.0002 13 21.4502 13 22.0002C13 22.5502 12.55 23.0002 12 23.0002H2C1.45 23.0002 1 22.5502 1 22.0002C1 21.4502 1.45 21.0002 2 21.0002ZM5.24 8.07017L8.07 5.24017L20.8 17.9702C21.58 18.7502 21.58 20.0202 20.8 20.8002C20.02 21.5802 18.75 21.5802 17.97 20.8002L5.24 8.07017ZM13.73 2.41017L16.56 5.24017C17.34 6.02017 17.34 7.29017 16.56 8.07017L15.14 9.49017L9.49 3.83017L10.9 2.42017C11.68 1.63017 12.95 1.63017 13.73 2.41017ZM3.83 9.48017L9.49 15.1402L8.08 16.5502C7.3 17.3302 6.03 17.3302 5.25 16.5502L2.42 13.7202C1.64 12.9402 1.64 11.6702 2.42 10.8902L3.83 9.48017Z"
  />
</template>
