<template>
  <path
    d="M20 5.00018H10.88L10 2.00018H4C2.9 2.00018 2 2.90018 2 4.00018V17.0002C2 18.1002 2.9 19.0002 4 19.0002H11L12 22.0002H20C21.1 22.0002 22 21.1002 22 20.0002V7.00018C22 5.90018 21.1 5.00018 20 5.00018ZM7.17 14.5902C4.92 14.5902 3.08 12.7602 3.08 10.5002C3.08 8.24018 4.91 6.41018 7.17 6.41018C8.21 6.41018 9.16 6.78018 9.91 7.48018L9.98 7.54018L8.75 8.72018L8.69 8.67018C8.4 8.40018 7.91 8.08018 7.17 8.08018C5.86 8.08018 4.79 9.17018 4.79 10.5002C4.79 11.8302 5.86 12.9202 7.17 12.9202C8.54 12.9202 9.13 12.0502 9.29 11.4602H7.08V9.91018H11.03L11.04 9.98018C11.08 10.1902 11.09 10.3802 11.09 10.5902C11.09 12.9402 9.48 14.5902 7.17 14.5902ZM13.2 12.8802C13.53 13.4802 13.94 14.0602 14.39 14.5802L13.85 15.1102L13.2 12.8802ZM13.97 12.1202H12.98L12.67 11.0802H16.66C16.66 11.0802 16.32 12.3902 15.1 13.8202C14.58 13.2002 14.21 12.5902 13.97 12.1202ZM21 20.0002C21 20.5502 20.55 21.0002 20 21.0002H13L15 19.0002L14.19 16.2302L15.11 15.3102L17.79 18.0002L18.52 17.2702L15.81 14.5902C16.71 13.5602 17.41 12.3402 17.73 11.0802H19V10.0402H15.36V9.00018H14.32V10.0402H12.36L11.18 6.00018H20C20.55 6.00018 21 6.45018 21 7.00018V20.0002Z"
  />
</template>
