<template>
  <path
    d="M20.5 19.0002H3.5C2.95 19.0002 2.5 19.4502 2.5 20.0002C2.5 20.5502 2.95 21.0002 3.5 21.0002H20.5C21.05 21.0002 21.5 20.5502 21.5 20.0002C21.5 19.4502 21.05 19.0002 20.5 19.0002ZM3.51 11.6102L19.34 15.8502C20.14 16.0602 20.96 15.5902 21.18 14.7902C21.39 13.9902 20.92 13.1702 20.12 12.9502L14.81 11.5302L12.23 3.08017C12.12 2.72017 11.84 2.45017 11.48 2.35017C10.8 2.17017 10.13 2.68017 10.13 3.39017V10.2702L5.15 8.95017L4.4 7.09017C4.28 6.80017 4.04 6.58017 3.73 6.50017L3.4 6.41017C3.08 6.32017 2.77 6.56017 2.77 6.89017V10.6402C2.77 11.1002 3.07 11.4902 3.51 11.6102Z"
  />
</template>
