<template>
  <path
    d="M17.81 4.47018C17.73 4.47018 17.65 4.45018 17.58 4.41018C15.66 3.42018 14 3.00018 12.01 3.00018C10.03 3.00018 8.14999 3.47018 6.43999 4.41018C6.19999 4.54018 5.89999 4.45018 5.75999 4.21018C5.62999 3.97018 5.71999 3.66018 5.95999 3.53018C7.81998 2.52018 9.85998 2.00018 12.01 2.00018C14.14 2.00018 16 2.47018 18.04 3.52018C18.29 3.65018 18.38 3.95018 18.25 4.19018C18.16 4.37018 17.99 4.47018 17.81 4.47018ZM3.49998 9.72018C3.39998 9.72018 3.29999 9.69018 3.20999 9.63018C2.97999 9.47018 2.92998 9.16018 3.08998 8.93018C4.07998 7.53018 5.33999 6.43018 6.83999 5.66018C9.97999 4.04018 14 4.03018 17.15 5.65018C18.65 6.42018 19.91 7.51018 20.9 8.90018C21.06 9.12018 21.01 9.44018 20.78 9.60018C20.55 9.76018 20.24 9.71018 20.08 9.48018C19.18 8.22018 18.04 7.23018 16.69 6.54018C13.82 5.07018 10.15 5.07018 7.28999 6.55018C5.92999 7.25018 4.78999 8.25018 3.88999 9.51018C3.80999 9.65018 3.65998 9.72018 3.49998 9.72018ZM9.74999 21.7902C9.61999 21.7902 9.48998 21.7402 9.39998 21.6402C8.52998 20.7702 8.05999 20.2102 7.38999 19.0002C6.69999 17.7702 6.33999 16.2702 6.33999 14.6602C6.33999 11.6902 8.87998 9.27018 12 9.27018C15.12 9.27018 17.66 11.6902 17.66 14.6602C17.66 14.9402 17.44 15.1602 17.16 15.1602C16.88 15.1602 16.66 14.9402 16.66 14.6602C16.66 12.2402 14.57 10.2702 12 10.2702C9.42999 10.2702 7.33999 12.2402 7.33999 14.6602C7.33999 16.1002 7.65999 17.4302 8.26999 18.5102C8.90999 19.6602 9.34999 20.1502 10.12 20.9302C10.31 21.1302 10.31 21.4402 10.12 21.6402C10.01 21.7402 9.87999 21.7902 9.74999 21.7902ZM16.92 19.9402C15.73 19.9402 14.68 19.6402 13.82 19.0502C12.33 18.0402 11.44 16.4002 11.44 14.6602C11.44 14.3802 11.66 14.1602 11.94 14.1602C12.22 14.1602 12.44 14.3802 12.44 14.6602C12.44 16.0702 13.16 17.4002 14.38 18.2202C15.09 18.7002 15.92 18.9302 16.92 18.9302C17.16 18.9302 17.56 18.9002 17.96 18.8302C18.23 18.7802 18.49 18.9602 18.54 19.2402C18.59 19.5102 18.41 19.7702 18.13 19.8202C17.56 19.9302 17.06 19.9402 16.92 19.9402ZM14.91 22.0002C14.87 22.0002 14.82 21.9902 14.78 21.9802C13.19 21.5402 12.15 20.9502 11.06 19.8802C9.65999 18.4902 8.88999 16.6402 8.88999 14.6602C8.88999 13.0402 10.27 11.7202 11.97 11.7202C13.67 11.7202 15.05 13.0402 15.05 14.6602C15.05 15.7302 15.98 16.6002 17.13 16.6002C18.28 16.6002 19.21 15.7302 19.21 14.6602C19.21 10.8902 15.96 7.83018 11.96 7.83018C9.11998 7.83018 6.51998 9.41018 5.34998 11.8602C4.95998 12.6702 4.75999 13.6202 4.75999 14.6602C4.75999 15.4402 4.82998 16.6702 5.42998 18.2702C5.52998 18.5302 5.39998 18.8202 5.13998 18.9102C4.87998 19.0102 4.58999 18.8702 4.49998 18.6202C4.00998 17.3102 3.76998 16.0102 3.76998 14.6602C3.76998 13.4602 3.99998 12.3702 4.44998 11.4202C5.77998 8.63018 8.72998 6.82018 11.96 6.82018C16.51 6.82018 20.21 10.3302 20.21 14.6502C20.21 16.2702 18.83 17.5902 17.13 17.5902C15.43 17.5902 14.05 16.2702 14.05 14.6502C14.05 13.5802 13.12 12.7102 11.97 12.7102C10.82 12.7102 9.88999 13.5802 9.88999 14.6502C9.88999 16.3602 10.55 17.9602 11.76 19.1602C12.71 20.1002 13.62 20.6202 15.03 21.0102C15.3 21.0802 15.45 21.3602 15.38 21.6202C15.33 21.8502 15.12 22.0002 14.91 22.0002Z"
  />
</template>
