<template>
  <path
    d="M19.66 3.9902C17.02 2.1902 13.76 3.0302 12 5.0902C10.24 3.0302 6.98003 2.1802 4.34003 3.9902C2.94003 4.9502 2.06003 6.5702 2.00003 8.2802C1.86003 12.1602 5.30003 15.2702 10.55 20.0402L10.65 20.1302C11.41 20.8202 12.58 20.8202 13.34 20.1202L13.45 20.0202C18.7 15.2602 22.13 12.1502 22 8.2702C21.94 6.5702 21.06 4.9502 19.66 3.9902ZM12.1 18.5502L12 18.6502L11.9 18.5502C7.14003 14.2402 4.00003 11.3902 4.00003 8.5002C4.00003 6.5002 5.50003 5.0002 7.50003 5.0002C9.04003 5.0002 10.54 5.9902 11.07 7.3602H12.94C13.46 5.9902 14.96 5.0002 16.5 5.0002C18.5 5.0002 20 6.5002 20 8.5002C20 11.3902 16.86 14.2402 12.1 18.5502Z"
  />
</template>
