<template>
  <path
    d="M21.68 9.71018L17.96 17.9002C17.73 18.3902 17 18.2302 17 17.6902V11.0002H15.5C15.22 11.0002 15 10.7802 15 10.5002V4.50018C15 4.22018 15.22 4.00018 15.5 4.00018H21.26C21.61 4.00018 21.86 4.36018 21.72 4.69018L20 9.00018H21.22C21.59 9.00018 21.83 9.38018 21.68 9.71018ZM15 13.0002V20.0002H4C2.9 20.0002 2 19.1002 2 18.0002V15.0002C2 13.9002 2.9 13.0002 4 13.0002H15ZM6.25 16.5002C6.25 16.0902 5.91 15.7502 5.5 15.7502C5.09 15.7502 4.75 16.0902 4.75 16.5002C4.75 16.9102 5.09 17.2502 5.5 17.2502C5.91 17.2502 6.25 16.9102 6.25 16.5002ZM13 4.00018V11.0002H4C2.9 11.0002 2 10.1002 2 9.00018V6.00018C2 4.90018 2.9 4.00018 4 4.00018H13ZM6.25 7.50018C6.25 7.09018 5.91 6.75018 5.5 6.75018C5.09 6.75018 4.75 7.09018 4.75 7.50018C4.75 7.91018 5.09 8.25018 5.5 8.25018C5.91 8.25018 6.25 7.91018 6.25 7.50018Z"
  />
</template>
