<template>
  <path
    d="M11 3.18018V20.8202C11 21.4602 10.41 21.9402 9.79 21.8002C5.32 20.8002 2 16.7902 2 12.0002C2 7.21018 5.32 3.20018 9.79 2.20018C10.41 2.06018 11 2.54018 11 3.18018ZM13.03 3.18018V9.99018C13.03 10.5402 13.48 10.9902 14.03 10.9902H20.82C21.46 10.9902 21.94 10.4002 21.8 9.77018C20.95 6.01018 18 3.05018 14.25 2.20018C13.62 2.06018 13.03 2.54018 13.03 3.18018ZM13.03 14.0102V20.8202C13.03 21.4602 13.62 21.9402 14.25 21.8002C18.01 20.9502 20.96 17.9802 21.81 14.2202C21.95 13.6002 21.46 13.0002 20.83 13.0002H14.04C13.48 13.0102 13.03 13.4602 13.03 14.0102Z"
  />
</template>
