<template>
  <path
    d="M12 2.00018C6.48 2.00018 2 6.48018 2 12.0002C2 17.5202 6.48 22.0002 12 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48018 17.52 2.00018 12 2.00018ZM8.75 13.6802C8.62 14.1102 8.13 14.3102 7.73 14.1302C7.39 13.9702 7.22 13.5902 7.33 13.2302C7.45 12.8202 7.51 12.4002 7.5 11.9902C7.49 11.5802 7.44 11.1902 7.33 10.8102C7.23 10.4502 7.39 10.0602 7.73 9.91018C8.15 9.72018 8.64 9.95018 8.77 10.4002C8.92 10.9102 8.99 11.4302 9 11.9702C9 12.5302 8.92 13.1102 8.75 13.6802ZM11.89 15.2702C11.72 15.6802 11.22 15.8402 10.83 15.6202C10.5 15.4302 10.37 15.0302 10.51 14.6802C10.84 13.9102 11 13.0502 11 12.1202C11 11.1602 10.82 10.2302 10.47 9.34018C10.33 8.98018 10.49 8.58018 10.83 8.40018C11.22 8.20018 11.7 8.38018 11.86 8.79018C12.28 9.85018 12.49 10.9702 12.49 12.1202C12.51 13.2502 12.3 14.3102 11.89 15.2702ZM15 16.6002C14.83 17.0002 14.36 17.1802 13.98 16.9902C13.63 16.8202 13.46 16.4002 13.61 16.0402C14.2 14.6502 14.5 13.2902 14.5 11.9802C14.5 10.6702 14.2 9.33018 13.62 7.97018C13.46 7.61018 13.63 7.19018 13.98 7.02018C14.37 6.82018 14.83 7.00018 15 7.40018C15.66 8.94018 16 10.4802 16 11.9802C16 13.4802 15.66 15.0402 15 16.6002Z"
  />
</template>
