<template>
  <path
    d="M11.5 2.00018C6.81 2.00018 3 5.81018 3 10.5002C3 15.1902 6.81 19.0002 11.5 19.0002H12V22.0002C16.86 19.6602 20 15.0002 20 10.5002C20 5.81018 16.19 2.00018 11.5 2.00018ZM12.5 16.5002H10.5V14.5002H12.5V16.5002ZM12.9 11.7202C12.89 11.7302 12.88 11.7502 12.87 11.7702C12.82 11.8502 12.77 11.9302 12.73 12.0102C12.71 12.0402 12.7 12.0802 12.69 12.1202C12.66 12.1902 12.63 12.2602 12.61 12.3302C12.54 12.5402 12.51 12.7602 12.51 13.0102H10.5C10.5 12.5002 10.58 12.0702 10.7 11.7102C10.7 11.7002 10.7 11.6902 10.71 11.6802C10.72 11.6402 10.75 11.6202 10.76 11.5802C10.82 11.4202 10.89 11.2802 10.98 11.1402C11.01 11.0902 11.05 11.0402 11.08 10.9902C11.11 10.9502 11.13 10.9002 11.16 10.8702L11.17 10.8802C12.01 9.78018 13.38 9.44018 13.49 8.20018C13.58 7.22018 12.88 6.27018 11.92 6.07018C10.88 5.85018 9.94 6.46018 9.62 7.35018C9.48 7.71018 9.15 8.00018 8.74 8.00018H8.54C7.94 8.00018 7.5 7.41018 7.67 6.83018C8.22 5.01018 10.04 3.74018 12.1 4.04018C13.79 4.29018 15.14 5.68018 15.43 7.37018C15.87 9.81018 13.8 10.4002 12.9 11.7202Z"
  />
</template>
