<template>
  <path
    d="M9.01 14.0002H3C2.45 14.0002 2 14.4502 2 15.0002C2 15.5502 2.45 16.0002 3 16.0002H9.01V17.7902C9.01 18.2402 9.55 18.4602 9.86 18.1402L12.64 15.3502C12.83 15.1502 12.83 14.8402 12.64 14.6402L9.86 11.8502C9.55 11.5302 9.01 11.7602 9.01 12.2002V14.0002ZM14.99 11.7902V10.0002H21C21.55 10.0002 22 9.55018 22 9.00018C22 8.45018 21.55 8.00018 21 8.00018H14.99V6.21018C14.99 5.76018 14.45 5.54018 14.14 5.86018L11.36 8.65018C11.17 8.85018 11.17 9.16018 11.36 9.36018L14.14 12.1502C14.45 12.4602 14.99 12.2402 14.99 11.7902Z"
  />
</template>
