<template>
  <path
    d="M18.65 8.35018L15.86 11.1402C15.54 11.4602 15.76 12.0002 16.21 12.0002H18C18 15.3102 15.31 18.0002 12 18.0002C11.21 18.0002 10.44 17.8502 9.75003 17.5602C9.39003 17.4102 8.98003 17.5202 8.71003 17.7902C8.20003 18.3002 8.38003 19.1602 9.05003 19.4302C9.96003 19.8002 10.96 20.0002 12 20.0002C16.42 20.0002 20 16.4202 20 12.0002H21.79C22.24 12.0002 22.46 11.4602 22.14 11.1502L19.35 8.36018C19.16 8.16018 18.84 8.16018 18.65 8.35018ZM6.00003 12.0002C6.00003 8.69018 8.69003 6.00018 12 6.00018C12.79 6.00018 13.56 6.15018 14.25 6.44018C14.61 6.59018 15.02 6.48018 15.29 6.21018C15.8 5.70018 15.62 4.84018 14.95 4.57018C14.04 4.20018 13.04 4.00018 12 4.00018C7.58003 4.00018 4.00003 7.58018 4.00003 12.0002H2.21003C1.76003 12.0002 1.54003 12.5402 1.86003 12.8502L4.65003 15.6402C4.85003 15.8402 5.16003 15.8402 5.36003 15.6402L8.15003 12.8502C8.46003 12.5402 8.24003 12.0002 7.79003 12.0002H6.00003Z"
  />
</template>
