<template>
  <div class="input-base">
    <hive-input-textarea></hive-input-textarea>
    <hive-input-textarea :autosize="autosize" placeholder="自动适应高度"></hive-input-textarea>
    <hive-input-textarea :maxLength="maxLength" :showLimit="showLimit" placeholder="显示字数限制"></hive-input-textarea>
  </div>
</template>

<script>
  export default {
    data() {
      return {
        inputValue: 2,
        autosize: true,
        showLimit: true,
        maxLength: 100,
      };
    },
  };
</script>
