<template>
  <div class="input-base">
    <hive-input-textarea />
    <hive-input-textarea disabled />
    <hive-input-textarea error />
    <hive-input-textarea
      :autosize="autosize"
      placeholder="自动适应高度"
    />
    <hive-input-textarea
      :max-length="maxLength"
      :show-limit="showLimit"
      placeholder="显示字数限制"
    />
  </div>
</template>

<script>
export default {
  data() {
    return {
      inputValue: 2,
      autosize: true,
      showLimit: true,
      maxLength: 100
    };
  }
};
</script>
