<template>
  <div>
    <hive-alert
      type="info"
      message="信息提示"
      @onClose="handleClose"
      closeable
    />
  </div>
</template>

<script>
export default {
  data() {
    return {
    };
  },
  methods: {
    handleClose() {
      console.log('触发了回调');
    }
  }
};
</script>
