<template>
<demo-section>
  <drip-input
    :type="'textarea'"
    :style="{
      width: '100px'
    }"
    v-model="inputValue"
    :autosize="{
      minHeight: '50',
      maxHeight: '150'
    }">
  </drip-input>
</demo-section>
</template>

<script>
export default {
  data () {
    return {
      inputValue: ''
    }
  }
}
</script>
