import React from "react";
import Enzyme, { mount } from "enzyme";
import Adapter from "enzyme-adapter-react-16";
import { Columns } from "../../../src/components/containers/columns";

Enzyme.configure({ adapter: new Adapter() });

describe("Columns", () => {
    test("renders children", () => {
        const columns = mount(
            <Columns>
                <p>Foo</p>
            </Columns>
        );
        expect(columns.children()).toHaveLength(1);
    });
});
