import { FunctionComponent } from 'react';
import { ConfigProvider } from 'cn-next';
import { componentName } from 'src/const';
import ListFilter, { IListFilter } from 'src/view';

const Index = ConfigProvider.config(ListFilter, {
  componentName,
}) as FunctionComponent<IListFilter>;
Index.displayName = componentName;
export default Index;
