<template>
	<div class="syslogvis-container">
		<el-card shadow="hover" :body-style="{ padding: '5px 5px 0 5px', display: 'flex', width: '100%', height: '100%', alignItems: 'start' }">
			<el-form :model="state.queryParams" ref="queryForm" :show-message="false" :inlineMessage="true" label-width="auto" style="flex: 1 1 0%">
				<el-row :gutter="10">
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="开始时间" prop="name">
							<el-date-picker v-model="state.queryParams.startTime" type="datetime" placeholder="开始时间" :shortcuts="shortcuts" class="w100" />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="结束时间" prop="code">
							<el-date-picker v-model="state.queryParams.endTime" type="datetime" placeholder="结束时间" :shortcuts="shortcuts" class="w100" />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="方法名称">
							<el-input v-model="state.queryParams.actionName" placeholder="方法名称" clearable />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="账号名称">
							<el-input v-model="state.queryParams.account" placeholder="账号名称" clearable />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="状态">
							<el-select v-model="state.queryParams.status" placeholder="状态" clearable>
								<el-option label="成功" :value="200" />
								<el-option label="失败" :value="400" />
							</el-select>
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="耗时">
							<el-input v-model="state.queryParams.elapsed" placeholder="耗时>?MS" clearable />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="IP地址">
							<el-input v-model="state.queryParams.remoteIp" placeholder="IP地址" clearable />
						</el-form-item>
					</el-col>
				</el-row>
			</el-form>

			<el-divider style="height: calc(100% - 5px); margin: 0 10px" direction="vertical" />

			<el-row>
				<el-col>
					<el-button-group>
						<el-button type="primary" icon="ele-Search" @click="handleQuery" v-auth="'sysLogVis/page'" :loading="options.loading"> 查询 </el-button>
						<el-button icon="ele-Refresh" @click="resetQuery" :loading="options.loading"> 重置 </el-button>
					</el-button-group>
				</el-col>
			</el-row>
		</el-card>

		<el-card class="full-table" shadow="hover" style="margin-top: 5px">
			<vxe-grid ref="xGrid" class="xGrid-style" v-bind="options" v-on="gridEvents">
				<template #toolbar_buttons>
					<el-button icon="ele-MapLocation" type="primary" @click="handleMap" v-auth="'sysLogVis/visMap'"> 热力图 </el-button>
					<el-button icon="ele-DeleteFilled" type="danger" @click="handleClear" v-auth="'sysLogVis/clear'"> 清空 </el-button>
				</template>
				<template #toolbar_tools> </template>
				<template #empty>
					<el-empty :image-size="200" />
				</template>
				<template #row_status="{ row }">
					<el-tag v-if="row.status === '200'" type="success">成功</el-tag>
					<el-tag v-else type="danger">失败</el-tag>
				</template>
			</vxe-grid>
		</el-card>

		<VisMap ref="mapRef" :title="state.title" />
	</div>
</template>

<script lang="ts" setup name="sysLogVis">
import { onMounted, reactive, ref, defineAsyncComponent } from 'vue';
import { ElMessage } from 'element-plus';
import { useDateTimeShortCust } from '/@/hooks/dateTimeShortCust';
import { VxeGridInstance, VxeGridListeners, VxeGridPropTypes } from 'vxe-table';
import { useVxeTable } from '/@/hooks/useVxeTableOptionsHook';
import { Local } from '/@/utils/storage';

import { getAPI } from '/@/utils/axios-utils';
import { SysLogVisApi } from '/@/api-services';
import { SysLogVis, PageLogInput } from '/@/api-services/models';

const VisMap = defineAsyncComponent(() => import('./component/visMap.vue'));

const xGrid = ref<VxeGridInstance>();
const mapRef = ref<InstanceType<typeof VisMap>>();
const shortcuts = useDateTimeShortCust();
const state = reactive({
	queryParams: {
		startTime: undefined,
		endTime: undefined,
		status: undefined,
		actionName: undefined,
		account: undefined,
		elapsed: undefined,
		remoteIp: undefined,
	},
	localPageParam: {
		pageSize: 50 as number,
		defaultSort: { field: 'id', order: 'desc', descStr: 'desc' },
	},
	title: '',
});

// 本地存储参数
const localPageParamKey = 'localPageParam:sysVisLog';
// 表格参数配置
const options = useVxeTable<SysLogVis>(
	{
		id: 'sysVisLog',
		name: '访问日志',
		columns: [
			// { type: 'checkbox', width: 40 },
			{ type: 'seq', title: '序号', width: 60, fixed: 'left' },
			{ field: 'displayTitle', title: '显示名称', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'actionName', title: '方法名称', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'account', title: '账号名称', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'realName', title: '真实姓名', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'remoteIp', title: 'IP地址', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'location', title: '登录地点', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'longitude', title: '经度', minWidth: 100, showOverflow: 'tooltip' },
			{ field: 'latitude', title: '纬度', minWidth: 100, showOverflow: 'tooltip' },
			{ field: 'browser', title: '浏览器', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'os', title: '操作系统', minWidth: 150, showOverflow: 'tooltip' },
			{ field: 'status', title: '状态', minWidth: 70, showOverflow: 'tooltip', slots: { default: 'row_status' } },
			{ field: 'elapsed', title: '耗时(ms)', minWidth: 100, showOverflow: 'tooltip' },
			{ field: 'logDateTime', title: '日志时间', minWidth: 150, showOverflow: 'tooltip' },
		],
	},
	// vxeGrid配置参数(此处可覆写任何参数)，参考vxe-table官方文档
	{
		// 代理配置
		proxyConfig: { autoLoad: true, ajax: { query: ({ page, sort }) => handleQueryApi(page, sort) } },
		// 排序配置
		sortConfig: { defaultSort: Local.get(localPageParamKey)?.defaultSort || state.localPageParam.defaultSort },
		// 分页配置
		pagerConfig: { pageSize: Local.get(localPageParamKey)?.pageSize || state.localPageParam.pageSize },
		// 工具栏配置
		toolbarConfig: { export: false },
	}
);

// 页面初始化
onMounted(() => {
	state.localPageParam = Local.get(localPageParamKey) || state.localPageParam;
});

// 查询api
const handleQueryApi = async (page: VxeGridPropTypes.ProxyAjaxQueryPageParams, sort: VxeGridPropTypes.ProxyAjaxQuerySortCheckedParams) => {
	const params = Object.assign(state.queryParams, { page: page.currentPage, pageSize: page.pageSize, field: sort.field, order: sort.order, descStr: 'desc' }) as PageLogInput;
	return getAPI(SysLogVisApi).apiSysLogVisPagePost(params);
};

// 查询操作
const handleQuery = async () => {
	options.loading = true;
	await xGrid.value?.commitProxy('query');
	options.loading = false;
};

// 重置操作
const resetQuery = async () => {
	state.queryParams.startTime = undefined;
	state.queryParams.endTime = undefined;
	state.queryParams.status = undefined;
	state.queryParams.actionName = undefined;
	state.queryParams.account = undefined;
	state.queryParams.elapsed = undefined;
	state.queryParams.remoteIp = undefined;
	await xGrid.value?.commitProxy('reload');
};

// 表格事件
const gridEvents: VxeGridListeners<SysLogVis> = {
	// 只对 pager-config 配置时有效，分页发生改变时会触发该事件
	async pageChange({ pageSize }) {
		state.localPageParam.pageSize = pageSize;
		Local.set(localPageParamKey, state.localPageParam);
	},
	// 当排序条件发生变化时会触发该事件
	async sortChange({ field, order }) {
		state.localPageParam.defaultSort = { field: field, order: order!, descStr: 'desc' };
		Local.set(localPageParamKey, state.localPageParam);
	},
};

// 清空日志
const handleClear = async () => {
	options.loading = true;
	await getAPI(SysLogVisApi).apiSysLogVisClearPost();
	options.loading = false;
	ElMessage.success('清空成功');
	await handleQuery();
};

// 打开访问热力图
const handleMap = async () => {
	state.title = '访问者热力图';
	mapRef.value?.openDialog();
};
</script>
